=== OSes / CPU Architectures

Thanks to the C backend, Nim can run on a large set of architectures.

Please help testing Nim on less common architectures and add them below:

=== Linux

==== x86

==== x86_64

==== ppc64

==== ppc64el

==== armv6l

==== arm64

==== armel

==== s390

==== alpha

==== hppa

=== BSD

=== OSX

=== Windows

==== x86

==== x86_64

==== ppc64

==== armv6l

